import React from 'react';
import { mount } from 'enzyme';
import { TestMe } from './TestMe';

describe('TestMe Component', () => {
  it('should render correctly when hovered', () => {
    // TODO:
    // 1. mount a <TestMe> Component here
    // 2. use enzyme wrapper's find() method to retrieve the #innerMe element
    // 3. simulate a hover with "mouseover" event via the simulate() API
    // 4. make assertions with expect on the text() of the #innerMe element
  });
});
